Centrality (%)

0 10 20 30 40 50 60

1p

0

0.5

1

1.5

2 Data MC-Glauber MC-KLN CGC EKRT

= 2.76 TeV NNs Pb − ALICE Pb | < 0.8 η | c < 5.0 GeV/ Tp 0.2 <